== dictionaries/rougail/00-base.yml

[,yaml]
----
version: '1.1'
variable1:
  description: a port variable
  type: port
variable2:
  description: a port variable with default value
  type: port
  default: '8080'
variable3:
  description: a port variable with integer default value
  type: port
  default: 8080
----
== Variables

[cols="106a,106a",options="header"]
|====
| Variable                                                                                                 | Description                                                                                              
| 
**variable1** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `basic` `mandatory`                                                                                                          | 
A port variable.                                                                                                          
| 
**variable2** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `standard` `mandatory`                                                                                                          | 
A port variable with default value. +
**Default**: 8080                                                                                                          
| 
**variable3** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `standard` `mandatory`                                                                                                          | 
A port variable with integer default value. +
**Default**: 8080                                                                                                          
|====


