== dictionaries/rougail/00-base.yml

[,yaml]
----
---
version: '1.1'
variable1:
  description: a port variable
  type: port
variable2:
  description: a port variable with default value
  type: port
  default: '8080'
variable3:
  description: a port variable with integer default value
  type: port
  default: 8080
----
== Variables for "Rougail"

[cols="1a,1a"]
|====
| Variable   | Description   
| 

**rougail.variable1** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `basic` `mandatory`            | 
A port variable.               
| 

**rougail.variable2** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `standard` `mandatory`            | 
A port variable with default value. +
**Default**: 8080               
| 

**rougail.variable3** +
`https://rougail.readthedocs.io/en/latest/variable.html#variables-types[port]` `standard` `mandatory`            | 
A port variable with integer default value. +
**Default**: 8080               
|====

